/* Definitions of target machine for GNU compiler, for the pdp-11
   Copyright (C) 2002 Free Software Foundation, Inc.
   Contributed by Michael K. Gschwind (mike@vlsivie.tuwien.ac.at).

This file is part of GNU CC.

GNU CC is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 2, or (at your option)
any later version.

GNU CC is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
GNU General Public License for more details.

You should have received a copy of the GNU General Public License
along with GNU CC; see the file COPYING.  If not, write to
the Free Software Foundation, 59 Temple Place - Suite 330,
Boston, MA 02111-1307, USA.  */

/* Add any extra modes needed to represent the condition code.
   CCFPmode is used for FPU, but should we use a separate reg? */

CC (CCFP)

