%%
%%

\documentclass[11pt,a4paper]{report}
\usepackage{html}
\usepackage{float}
\usepackage{graphicx}
\usepackage{apcupsd}
\usepackage{longtable}
\usepackage{makeidx}
\usepackage{index}
\usepackage{setspace}
\usepackage{hyperref}

\makeindex

\sloppy

\begin{document}
\sloppy

\newfont{\bighead}{cmr17 at 36pt}
%% \topmargin -0.5in
%% \textheight 9in
\parskip 10pt
\parindent 0pt
%% \oddsidemargin -0.0in
%% \evensidemargin -0.25in
%% \textwidth 7in

\title{\includegraphics{./apcupsd.eps} \\ \bigskip
   \Large{Apcupsd is a UPS control system that permits
   orderly shutdown of your
   computer in the event of a power failure.} }
\author{Kern Sibbald}
\date{\vspace{2.0in}\today \\
      This manual documents apcupsd version 3.14.x \\
Copyright (C) 1999-2005 Kern Sibbald }


\maketitle

Copying and distribution of this file, with or without
modification, are permitted in any medium without royalty
provided the name Apcupsd, the copyright notice, and this notice
are preserved.

Apcupsd source code is released under the GNU General Public
License version 2. Please see the file COPYING in the main source
directory.

For more information on the project, please visit the main web
site at http://www.apcupsd.com

\clearpage
\tableofcontents
\clearpage
\listoffigures
\clearpage
\listoftables
\clearpage

\include{manual}
\printindex

\end{document}
