\psi_{tot}(x,-t_0,r) = \frac{1}{(2\pi)^2} \int\!\!\!\int
\tilde\Psi_{tot}\left(k_x,\frac{c}{2}\sqrt{k_x^2 + k_r^2},r=0\right)
